<template>
  <NuxtLayout>
    <!-- <link rel="preconnect" href="https://fonts.googleapis.com" />
    <link rel="preconnect" href="https://fonts.gstatic.com" />
    <link
      href="https://fonts.googleapis.com/css2?family=Lato:ital,wght@0,100;0,300;0,400;0,700;0,900;1,100;1,300;1,400;1,700;1,900&display=swap"
      rel="stylesheet"
    />
    <link
      href="https://fonts.googleapis.com/css2?family=Russo+One&display=swap"
      rel="stylesheet"
    /> -->
    <NuxtPage />
  </NuxtLayout>
</template>
